<#macro server id anchor="">link:{links_server_${id}_url}<#if anchor != "">#${anchor}</#if>[{links_server_${id}_name}]</#macro>
<#macro operator id anchor="">link:{links_operator_${id}_url}<#if anchor != "">#${anchor}</#if>[{links_operator_${id}_name}]</#macro>
<#macro ha id anchor="">link:{links_high-availability_${id}_url}<#if anchor != "">#${anchor}</#if>[{links_high-availability_${id}_name}]</#macro>
