= KEYCLOAK-7768 - Making Spring Boot 2 the default starter

Starting with release 4.1, the Spring Boot starter will be based on the Spring Boot 2 adapter. If you are using an older Spring Boot version, the keycloak-legacy-spring-boot-starter is available.