// Module included in the following assemblies:
//
// server_admin/topics/users.adoc

[id="proc-enabling-recaptcha_{context}"]
= Enabling reCAPTCHA

[role="_abstract"]
To safeguard registration against bots, {project_name} has integration with Google reCAPTCHA.

Once reCAPTCHA is enabled, you can edit `register.ftl` in your login theme to configure the placement and styling of the reCAPTCHA button on the registration page. 

.Procedure
. Enter the following URL in a browser:
+
[source,bash,subs=+attributes]
----
https://developers.google.com/recaptcha/
----

. Create an API key to get your reCAPTCHA site key and secret. Note the reCAPTCHA site key and secret for future use in this procedure.
+
NOTE: The localhost works by default. You do not have to specify a domain.
+
. Navigate to the {project_name} admin console.
. Click *Authentication* in the menu. 
. Click the *Flows* tab.  
. Select *Registration* from the drop down menu.
. Set the *reCAPTCHA* requirement to *Required*. This enables
reCAPTCHA.  
. Click *Actions* to the right of the reCAPTCHA flow entry.
. Click the *Config* link.
+
.Recaptcha config page
image:{project_images}/recaptcha-config.png[]

.. Enter the *Recaptcha Site Key* generated from the Google reCAPTCHA website.
.. Enter the *Recaptcha Secret* generated from the Google reCAPTCHA website.
. Authorize Google to use the registration page as an iframe.
+
NOTE: In {project_name}, websites cannot include a login page dialog in an iframe. This restriction is to prevent clickjacking attacks. You need to change the default HTTP response headers that is set in {project_name}.
+
.. Click *Realm Settings* in the menu. 
.. Click the *Security Defenses* tab.  
.. Enter `https://www.google.com` in the field for the *X-Frame-Options* header.
.. Enter `https://www.google.com` in the field for the *Content-Security-Policy* header.

[role="_additional-resources"]
.Additional resources
* For more information on extending and creating themes, see the link:{developerguide_link}[{developerguide_name}].
