
=== Clearing cache at runtime

You can clear the realm cache, user cache, or the external public keys.

.Procedure

. Log into the Admin Console.

. Click *Realm Settings*.

. Click the *Cache* tab.

. Clear the realm cache, the user cache or cache of external public keys.

NOTE: The cache will be cleared for all realms!
