= Keycloak uses Micrometer for metrics

Keycloak provides an optional a metrics endpoint which exports metrics in the Prometheus format.
In this release the implementation to provide this data switched from SmallRye to Micrometer.
Due to this change, metrics have been renamed.

See the migration guide for details.
