[id="assembly-setting-up-crossdc"]
:context: xsite
= Setting Up Cross DC with {jdgserver_name} {jdgserver_version_latest}

[role="_abstract"]
Use the following procedures for {jdgserver_name} {jdgserver_version_latest} to perform a basic setup of Cross-Datacenter replication.

include::proc-setting-up-infinispan.adoc[leveloffset=4]
include::proc-configuring-infinispan.adoc[leveloffset=4]
include::proc-creating-infinispan-caches.adoc[leveloffset=4]
include::proc-configuring-remote-cache.adoc[leveloffset=4]
